maestro-tester supervisor-test 5000 +RTS -hc -N1 3,791,491 bytes x seconds Mon Dec 9 14:13 2013

seconds

0.0 2.0 4.0 6.0 bytes

0k

200k

400k

600k

OTHER

(649)GHC.IO.Handle.FD.CAF

(859)Control.Distributed.P...

(853)Data.Rank1Typeable.CAF

(877)Control.Distributed.P...

MAIN

(1188)testChild__static/Mae...

(1184)viaClosure.loop/cloud...

(1189)testChild__sdict/Maes...

(862)Control.Distributed.P...

(652)GHC.IO.Encoding.CAF

(855)Control.Distributed.S...

(876)Control.Distributed.P...

(870)Control.Distributed.P...

(1180)__remoteTable/Maestro...

(593)SYSTEM

(891)Control.Distributed.P...

(589)PINNED

(1179)mkLocalNode/cloudWith...

(1177)viaClosure/main